vti_encoding:SR|utf8-nl
vti_timelastmodified:TR|09 Dec 1994 07:05:24 -0000
vti_extenderversion:SR|4.0.2.4426
vti_cacheddtm:TX|09 Dec 1994 07:05:24 -0000
vti_filesize:IR|1298
vti_syncwith_localhost\\d\:\\web\\obstech/d\:/web/obstech:TR|09 Dec 1994 07:05:24 -0000
