vti_encoding:SR|utf8-nl
vti_timelastmodified:TR|24 Apr 1996 06:15:54 -0000
vti_extenderversion:SR|4.0.2.4426
vti_cacheddtm:TX|24 Apr 1996 06:15:54 -0000
vti_filesize:IR|22241
vti_syncwith_localhost\\d\:\\web\\obstech/d\:/web/obstech:TR|24 Apr 1996 06:15:54 -0000
